% Avery L7664 Labels 
%
\documentclass[12pt,a4]{letter}
\usepackage{envlab}

\SetLabel{104mm}{71.9mm}{4.5mm}{18mm}{34mm}{2}{4}

\makelabels
\begin{document}
\startlabels
\PSwait

\end{document}
