% Avery L7160 Labels 
%
\documentclass[12pt,a4paper]{letter}
\usepackage{envlab}

\SetLabel{66mm}{38.1mm}{12mm}{5mm}{2.5mm}{3}{7}

\makelabels
\begin{document}
\startlabels
\PSwait


\printreturnlabels{21}{
	\fbox{
		\begin{minipage}[c]{50mm}
		\centering
		\includegraphics{/home/dennehym/DURC/Graphics/durc/durc_small.eps}\\[5mm]
		{\sf \bfseries \Large Systems Administrator}
		\end{minipage}
	}
}

\end{document}
