Dublin University Rifle Club

Version Date : January 14, 2002 Filename : Status :

Risk Assessment

Mark Dennehy

January 14, 2002

Executive Summary

Risk Assessment document for the Dublin University Rifle Club.

Executive Summary

Risk: Fire

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Poor Electrical System Death/Serious Injury

Smoke alarm Buildings Office

replacement of fire extinguisher retardent (water with CO_2)

Buildings Office

Smoking Fire No Smoking Policy Duty Range Offi- cer Buildings Office (Smoking, Gas storage, Corrosive chemical storage, Lumber storage)

Fire, Explosion, Gas leakage

None None Buildings Office

Risk: Personal Injury

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Accident (tripping, etc) Personal Injury First-Aid Training Chief Range Offi- cer Appropriate First-Aid Kit DUCAC Tripping Personal Injury None Buildings Office area to be kept clean

Buildings Office

Power washer to be stored unobtrusively

Buildings Office

Small entrance door Tripping/Head injury

None Change entrance door (allow wheelchair access at same time)

Buildings office, Department of Sport

Risk: Electrocution

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Substandard wiring on and immediately outside build- ing Electrocution None Rewiring Buildings Office

Risk: Poisoning

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Particulate Lead from range Respiratory disorders

None Improve ventilation Buildings Office

Tile powder/dust from Tilecutter Concrete/other dust from walls/rafters/buildings of- fice Chemical fumes from Buildings Office Lead/Arsenic/Antimony ingestion from inadaquate hygiene after handling pellets/bullets

Heavy Metal Poisoning and associated disorders

Sink, Soap Hot Water tap Buildings Office

Risk: Legal Liability

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Legal liability (for accident/injury claims or other legal actions)

Bankrupcy, Inability to recruit committee/range officers

None Liability Insurance DURC Committee, DUCAC, College

Risk: Chemical leakage

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Chemical leaks from Buildings Office

Damaged equipment, personal injury, respiratory disorders, poisoning

None Unknown Buildings Office

Risk: Sports Injury

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Back/Neck/Wrist/Elbow strain, Repetitive Strain Injury, Chronic Nerve Damage

Personal Injury (particularly for Junior shooters)

Higher-quality shooting clothing,

DURC Committee, DUCAC, College

Instructor/Coaching courses,

DURC Committee, DUCAC, College

More suitable equipment, DURC Committee, DUCAC, College

Student sports physiotherapy service

DURC Committee, DUCAC, College

Risk: Flooding

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Flooding due to poor drainage

Equipment, Range damage

None Cleaning of drains in park lane

Buildings Office

Flooding due to leaking roof

Equipment, Range damage

None Fix roof outside range Buildings Office

Risk: Hearing damage

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Loud noise from rifles Permanent hearing impairment or loss

Ear defenders (adaquately provided and mandatory for all members)

None Duty Range Offi- cer

Executive Summary

Risk: Theft

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Equipment theft Equipment loss Adaquate precautions on away trips, secure storage, insurance

DURC Committee, DUCAC/College (secure storage, insurance)

Security camera/lights for Park Lane

College

Risk: Equipment Malfunction

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Equipment malfunction Personal Injury, Equipment damage/loss

Regular maintainance, inspection, supervision

None DURC

Risk: Gunshot Wound

Hazard Consequence Preventative Measure Person

In Place Needed Responsible Ricochet Personal Injury Adaquate range design, Buildings Office/Department of Sport

Correct supervision Duty Range Offi- cer Accidental discharge Personal Injury Correct Supervision Duty Range Offi- cer Risk: Power Failure

Hazard Consequence Preventative Measure Person

In Place Needed Responsible No lighting Personal Injury Torches DURC

Rewiring, Emergency light- ing Buildings Office

Accidental discharge of firearm

Personal Injury, Ricochet

Adaquate training of members

Duty Range Offi- cer